Cómo empezar

Se puede acceder a la aplicación de Control de 3dfx Tools mediante el Panel de control de Windows.

1	Haga clic en el botón Inicio de Windows, ponga el cursor en Configuración y luego haga clic sobre Panel de control.

2	Haga doble clic en el icono de 3dfx Tools.


Obtener ayuda
Para obtener ayuda

Existe ayuda en línea la que se puede acceder oprimiendo la tecla F1 mientras se está en la página de control de 3dfx Tools.  Esto entregará información general de ayuda para controlar 3dfx Tools.

Se puede acceder a los contenidos completos de ayuda desde la ayuda en línea o haciendo clic en el botón Ayuda en la aplicación Control de 3dfx Tools.  Esto entrega información sobre cualquier consulta de 3dfx Tools.


Para una herramienta específica

Existe ayuda en línea para cada herramienta individual y ésta se puede acceder oprimiendo la tecla F1 mientras se está en cualquiera de las páginas de control de herramientas.  Esto entregará información de ayuda sobre la página en uso.


Eliminación de 3dfx Tools

Para sacar 3dfx Tools de su sistema:

1	Cierre todos los programas.

2	Haga clic en el botón Inicio de Windows, ponga el cursor en Configuración y luego haga clic sobre el Panel de control.

3	Haga doble clic en el icono de Agregar o eliminar programas.

4	Siga las instrucciones de la pantalla.

5	Debe reiniciar su sistema para completar la eliminación de 3dfx Tools.


Página de Control de 3dfx Tools

Esta es la página de control general para 3dfx Tools.

La página de control contiene una lista de todas las herramientas instaladas actualmente y permite al usuario habilitar o inhabilitar estas herramientas según sea necesario.

Si hay instalado más de un acelerador de gráficos, la herramienta se puede activar o desactivar para cada tarjeta concreta.


Cómo habilitar o inhabilitar una herramienta

Para habilitar o inhabilitar una herramienta:

1	Seleccione el acelerador de gráficos para el que desea activar o desactivar la herramienta.

2	Seleccione o elimine la selección del casilla de verificación de la herramienta, según sea necesario.

3	Haga clic en el botón Aplicar o en Aceptar si desea aplicar los cambios.

Si quiere deshacer los cambios haga clic en Cancelar.

Las páginas de control para herramientas inhabilitadas no se desplegarán en la aplicación de Control de 3dfx Tools ni en la página de Configuraciones avanzadas.


Acerca de 3dfx Tools

Se puede acceder al Cuadro Acerca de 3dfx Tools haciendo clic con el botón izquierdo del mouse en la barra de título de la aplicación de Control de 3dfx Tools y seleccionando Acerca de 3dfx Tools.

El Cuadro Acerca de contiene información sobre la Versión.